0 500 1000 1500 2000 1.0

1.2

1.4

0 1 2 0.0

0.1

0.2

u / u^*_0 c_R [

m^{-2}]

phase separated

homogeneous

(A)

K / (a^2e^{ub/kBT}) u / u^*

(B)_{x = 0.1}

x = 0.2 x = 0.3 c_R = 1000

m^{-2}